11/8/01 - SE 2A4exercises01.lab5 - page 1

Softwar e Eng. 2AO4 - Softwar e Design I - 2001 Laboratory 5

For weeks starting November 9 and November 16.

You are to repeat Laboratory 4 removing the restriction that n must be between 1 and 100. In this implementation, you are to use dynamic space allocation. The only change in the specification is that we cannot define ok(n) precisely since we do not know how much space is available. ok(n) must be regarded as “space available”. Note that if you call an S procedure for a value of n that is already a triangle, no additional space will be needed; If the S procedure is START(n), space may be returned to the system’sspace pool. Since there may be other users of the space pool, we can never predict what the value of ok(n) will be.